From 9c20287f50b1808b6efda02fae217bbc11be8e9b Mon Sep 17 00:00:00 2001
From: Dennis Brentjes <d.brentjes@gmail.com>
Date: Sun, 21 May 2017 18:32:28 +0200
Subject: Discussed the new results

---
 content/results.tex | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'content/results.tex')

diff --git a/content/results.tex b/content/results.tex
index f3db200..62cfb65 100644
--- a/content/results.tex
+++ b/content/results.tex
@@ -20,9 +20,9 @@ The following results were gathered with the pc specs as listed in appendix \ref
 \begin{tabular}{|c||c|c|c|c|c|c|}
 \hline
 Node & prepre & premix & prepost & realpre & realmix & realpost \\\hline\hline  
-Node1 ec 500 & 3.677 (0.024) & 2.856 (0.017) & 1.201 (0.025) & 0.311 (0.004) & 0.126 (0.005) & 0.127 (0.005) \\\hline
-Node2 ec 500 & 3.692 (0.025) & 2.855 (0.018) & 1.192 (0.026) & 0.312 (0.004) & 0.126 (0.005) & 0.126 (0.005) \\\hline
-Node3 ec 500 & 3.688 (0.022) & 2.858 (0.016) & 1.204 (0.032) & 0.313 (0.005) & 0.218 (0.004) & 0.463 (0.017) \\\hline
+Node1 ec 500 & 3.662 (0.030) & 2.819 (0.015) & 1.163 (0.029) & 0.299 (0.004) & 0.122 (0.004) & 0.123 (0.004) \\\hline
+Node2 ec 500 & 3.676 (0.025) & 2.818 (0.020) & 1.170 (0.029) & 0.302 (0.005) & 0.124 (0.005) & 0.123 (0.005) \\\hline
+Node3 ec 500 & 3.680 (0.026) & 2.819 (0.018) & 1.169 (0.028) & 0.302 (0.004) & 0.212 (0.004) & 0.451 (0.020) \\\hline
 \end{tabular}
 }
 \caption{Node time average over runs with standard deviation in seconds using ed25519.}
-- 
cgit v1.2.3-70-g09d2

