From 9c20287f50b1808b6efda02fae217bbc11be8e9b Mon Sep 17 00:00:00 2001
From: Dennis Brentjes <d.brentjes@gmail.com>
Date: Sun, 21 May 2017 18:32:28 +0200
Subject: Discussed the new results

---
 appendices/appendix.tex | 31 ++++++++++++++++---------------
 1 file changed, 16 insertions(+), 15 deletions(-)

(limited to 'appendices/appendix.tex')

diff --git a/appendices/appendix.tex b/appendices/appendix.tex
index 26fef6e..138c7d7 100644
--- a/appendices/appendix.tex
+++ b/appendices/appendix.tex
@@ -38,21 +38,22 @@ Turbo Boost: &off \\
 \noindent\resizebox{\columnwidth}{!}{
 \begin{tabular}{|l r r r|}
 \hline
-System Benchmarks Index Values              & BASELINE  &     RESULT  &  INDEX\\
-Dhrystone 2 using register variables        & 116700.0  & 30352428.6  & 2600.9\\
-Double-Precision Whetstone                  &     55.0  &     3953.8  &  718.9\\
-Execl Throughput                            &     43.0  &     4866.8  & 1131.8\\
-File Copy 1024 bufsize 2000 maxblocks       &   3960.0  &  1021697.7  & 2580.0\\
-File Copy 256 bufsize 500 maxblocks         &   1655.0  &   287500.0  & 1737.2\\
-File Copy 4096 bufsize 8000 maxblocks       &   5800.0  &  2065991.1  & 3562.1\\
-Pipe Throughput                             &  12440.0  &  2081172.9  & 1673.0\\
-Pipe-based Context Switching                &   4000.0  &   137521.7  &  343.8\\
-Process Creation                            &    126.0  &     5557.8  &  441.1\\
-Shell Scripts (1 concurrent)                &     42.4  &     1936.9  &  456.8\\
-Shell Scripts (8 concurrent)                &      6.0  &     1135.7  & 1892.8\\
-System Call Overhead                        &  15000.0  &  3185882.9  & 2123.9\\
-                                            &           &             & ======\\
-System Benchmarks Index Score               &           &             & 1258.2\\
+System Benchmarks Index Values              &BASELINE  &    RESULT  & INDEX\\\hline
+Dhrystone 2 using register variables        &116700.0  &28324596.9  &2427.1\\\hline
+Double-Precision Whetstone                  &    55.0  &    3683.4  & 669.7\\\hline
+Execl Throughput                            &    43.0  &    4629.5  &1076.6\\\hline
+File Copy 1024 bufsize 2000 maxblocks       &  3960.0  &  982540.2  &2481.2\\\hline
+File Copy 256 bufsize 500 maxblocks         &  1655.0  &  275396.4  &1664.0\\\hline
+File Copy 4096 bufsize 8000 maxblocks       &  5800.0  & 1976435.4  &3407.6\\\hline
+Pipe Throughput                             & 12440.0  & 1939188.3  &1558.8\\\hline
+Pipe-based Context Switching                &  4000.0  &  115504.5  & 288.8\\\hline
+Process Creation                            &   126.0  &    5137.2  & 407.7\\\hline
+Shell Scripts (1 concurrent)                &    42.4  &    1885.8  & 444.8\\\hline
+Shell Scripts (8 concurrent)                &     6.0  &    1093.4  &1822.3\\\hline
+System Call Overhead                        & 15000.0  & 2935648.7  &1957.1\\\hline
+\hline
+System Benchmarks Index Score               &          &            &1178.4\\\hline
+
 \hline
 \end{tabular}
 }
-- 
cgit v1.2.3-70-g09d2

